80^o

70^o

60^o

50^o

1200 APLT

1800

0000

0600

+

-

By = -3 ± 2 nT

Bz = 0± 2 nT

New Millstone Hill / Sondrestrom Convection Model

ANNUAL

ϕ=34kv

-20

-15

-10

-5

0

5

10