log electron Density (1/m^3)

60^o 50^o 40^o 30^o

12

18

00LT

06

10.8 11 11.2

11.4

11.6

11.8 12 Ion Temperature (K)

60^o 50^o 40^o 30^o

12

18

00LT

06

900 1000

1100

1200

1300

1400

1500

1600

Electron Temperature (K)

60^o 50^o 40^o 30^o

12

18

00LT

06

1000

1200

1400

1600

1800

2000

TEC in 200-600km (TECU)

60^o 50^o 40^o 30^o

12

18

00LT

06

5 10 15 20 25 30 35 40

Millstone Hill Radar Model Ionosphere 14-Feb-2025