log electron Density (1/m^3)

Altitude (km)

200 300 400 500 600

10

10.5

11

11.5

12

12.5

Ion Temperature (K)

Geodetic Latitude (degrees)

35 40 45 50 55 500

1000

1500

2000

Electron Temperature (K)

Geodetic Latitude (degrees)

35 40 45 50 55 200 300 400 500 600

500

1000

1500

2000

2500

3000 13-Feb-2025 F10.7 = 173 ap = 15 27 27 27 27 15 27 27

14-Feb-2025 F10.7 = 179 ap = 48 27 27 15 48 15 27 27

Millstone Hill Radar Model Ionosphere 14-Feb-2025 18:04:23